Great pictures and update, Mary! Your garden look...

Great pictures and update, Mary! Your garden looks very lush. We got flooded out of a garden this year. We're growing big mosquitos instead! We've hardly had any rain and the temps are really warm for us, so it has been a perfect summer so far! I bet if we had apple trees they would have been pollinated this year too! I hope you post pics of your apples at the end of the summer too! Do your trees have a nice scent?

Carol